-3 -2 -1 0 1 2 3 38 40 42 44 46 48 50 52

Jet Pt vs phi AveJetPtvsPhi

Entries 98475 Mean -0.006005 Mean y 46.68 RMS 1.812 RMS y 73.82 Underflow 0 Overflow 0

Jet Pt vs phi