-3 -2 -1 0 1 2 3 190

200

210

220

230

240

250 Jet P vs phi AveJetPvsPhi

Entries 95343 Mean -0.002945 Mean y 216.8 RMS 1.812 RMS y 328.1 Underflow 0 Overflow 0

Jet P vs phi