-3 -2 -1 0 1 2 3

1500

1550

1600

1650

1700

1750

1800

1850

1900

Jet Phi JetPhi

Entries 110588 Mean -0.004896 RMS 1.811 Underflow 0 Overflow 0

Jet Phi