-3 -2 -1 0 1 2 3 42 44 46 48 50 52 54 56 Jet Pt vs phi AveJetPtvsPhi

Entries 96411 Mean -0.01423 Mean y 47.01 RMS 1.813 RMS y 74.18 Underflow 0 Overflow 0

Jet Pt vs phi