-3 -2 -1 0 1 2 3 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

Jet Phi Distance JetDeltaPhi

Entries 16050 Mean 0.003341 RMS 2.78 Underflow 0 Overflow 0

Jet Phi Distance