0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

2

4

6

8

10

12 Jet R Distance JetDeltaR

Entries 4761 Mean 1.565 RMS 0.32 Underflow 0 Overflow 4595

Jet R Distance