-3 -2 -1 0 1 2 3 0 20 40 60 80 100 120 140 160

Jet Phi Distance JetDeltaPhi

Entries 1161 Mean 0.1145 RMS 2.765 Underflow 0 Overflow 0

Jet Phi Distance