-3 -2 -1 0 1 2 3 150

200

250

300

350 Jet P vs phi AveJetPvsPhi

Entries 7566 Mean -0.02106 Mean y 213 RMS 1.807 RMS y 331 Underflow 0 Overflow 0

Jet P vs phi