-3 -2 -1 0 1 2 3

150

200

250

300

350 Jet E vs phi AveJetEvsPhi

Entries 4419 Mean 0.01232 Mean y 212.1 RMS 1.823 RMS y 332.1 Underflow 0 Overflow 0

Jet E vs phi