-3 -2 -1 0 1 2 3 0 50 100 150 200 250 300 350

Jet Phi Distance JetDeltaPhi

Entries 2563 Mean 0.004002 RMS 2.751 Underflow 0 Overflow 0

Jet Phi Distance