-3 -2 -1 0 1 2 3 160

180 200

220 240

260

280 Jet P vs phi AveJetPvsPhi

Entries 26637 Mean -0.003052 Mean y 209.8 RMS 1.808 RMS y 314 Underflow 0 Overflow 0

Jet P vs phi