-3 -2 -1 0 1 2 3 40

50

60

70

80

90

Jet Et vs phi AveJetEtvsPhi

Entries 14683 Mean 0.01532 Mean y 57.73 RMS 1.815 RMS y 115.6 Underflow 0 Overflow 0

Jet Et vs phi