-3 -2 -1 0 1 2 3 160 180 200 220 240 260 280 300 Jet E vs phi AveJetEvsPhi

Entries 15325 Mean -0.003821 Mean y 217.6 RMS 1.822 RMS y 329 Underflow 0 Overflow 0

Jet E vs phi