-3 -2 -1 0 1 2 3 40 45 50 55 60 65 70 75 80 85 Jet Et vs phi AveJetEtvsPhi

Entries 27552 Mean -0.000283 Mean y 57.34 RMS 1.803 RMS y 117.7 Underflow 0 Overflow 0

Jet Et vs phi