-3 -2 -1 0 1 2 3

180

200

220

240

260

Jet E vs phi AveJetEvsPhi

Entries 28988 Mean -0.002392 Mean y 212.1 RMS 1.804 RMS y 320.6 Underflow 0 Overflow 0

Jet E vs phi