-3 -2 -1 0 1 2 3 10

11

12

13

14

15 Jet M vs phi AveJetMvsPhi

Entries 34412 Mean -0.03114 Mean y 11.93 RMS 1.81 RMS y 18.63 Underflow 0 Overflow 0

Jet M vs phi