-3 -2 -1 0 1 2 3 40 45 50 55 60 65 70 Jet Pt vs phi AveJetPtvsPhi

Entries 31657 Mean -0.01539 Mean y 55.54 RMS 1.809 RMS y 113.8 Underflow 0 Overflow 0

Jet Pt vs phi