-3 -2 -1 0 1 2 3 40 45 50 55 60 65 70 75 80 Jet Et vs phi AveJetEtvsPhi

Entries 21701 Mean -0.01255 Mean y 59.79 RMS 1.812 RMS y 124.9 Underflow 0 Overflow 0

Jet Et vs phi