-3 -2 -1 0 1 2 3 9 10 11 12 13 14 15 16

Jet M vs phi AveJetMvsPhi

Entries 20685 Mean -0.02078 Mean y 12.21 RMS 1.812 RMS y 18.81 Underflow 0 Overflow 0

Jet M vs phi