-3 -2 -1 0 1 2 3 180 200 220 240 260 280 300 Jet P vs phi AveJetPvsPhi

Entries 23716 Mean -0.02024 Mean y 219.6 RMS 1.812 RMS y 331.5 Underflow 0 Overflow 0

Jet P vs phi