ϕ -3 -2 -1 0 1 2 3

1500

2000

2500

3000

3500

4000 ϕ C4 Jet C4_phi

Entries 92332 Mean 0.01332 RMS 1.811

C4_phi

Entries 104095 Mean 0.0006111 RMS 1.814

14.0.0.Y AtlasPoint1 12.0.6.5 ϕ C4 Jet