0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0

2000

4000

6000

8000

10000

Electron M Electron_M

Entries 10514 Mean 0.0005108 RMS 1.677e-05

Electron_M

Entries 11687 Mean 0.0005109 RMS 1.702e-05

14.0.0.Y AtlasPoint1 12.0.6.5

Electron M