η -5 -4 -3 -2 -1 0 1 2 3 4 5 0 200 400 600 800 1000

1200 η Electron Electron_eta

Entries 10514 Mean 0.009327 RMS 1.362

Electron_eta

Entries 11687 Mean 0.02341 RMS 1.366

14.0.0.Y AtlasPoint1 12.0.6.5 η Electron