η)/η (Delta

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05 0 200 400 600 800 1000

1200

1400

1600

1800

2000

Electron eta resolution Electron_eta_Res Entries 1997 Mean 0 RMS 0

Electron_eta_Res

Entries 1931

14.0.0.Y AtlasPoint1 12.0.6.5

Electron eta resolution