ϕ -3 -2 -1 0 1 2 3 150 200 250 300 350 400 450 500 ϕ Electron Electron_phi

Entries 10514 Mean -7.079e-05 RMS 1.795

Electron_phi

Entries 11687 Mean -0.0008005 RMS 1.803

14.0.0.Y AtlasPoint1 12.0.6.5 ϕ Electron