ϕ -3 -2 -1 0 1 2 3 100

150

200

250

300 ϕ Muon Muon_phi

Entries 5903 Mean -0.004377 RMS 1.804

Muon_phi

Entries 6628 Mean -0.00529 RMS 1.817

14.0.0.Y AtlasPoint1 12.0.6.5 ϕ Muon