ϕ)/ϕ (Delta

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05 0 100 200 300 400 500 600 700 800 900

Muon phi resolution Muon_phi_Res

Entries 1792 Mean -4.619e-10 RMS 4.599e-08

Muon_phi_Res

Entries 2040 Mean -7.444e-10 RMS 4.539e-08

14.0.0.Y AtlasPoint1 12.0.6.5

Muon phi resolution