SCT TIM Context and Essential Model

Local SCT control

Local processor

TTCvi

TTC crate

Optical TTC signals

Configuration and control

Registers

TTC signals

Global ATLAS signals

TTC Interface Module (TIM)

TTCrx Standalone clock and control

VME slave interface

Event ID FIFO

Timing and control logic

Masked Busy OR

ROD

Fast commands and Event ID

Clock Busy Busy

Busy module

SCT ROD Busy to veto CTP

JBL/TJF UCL 30.10.98