FD data quality 1992 pass 7

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5

35 36 37 38 39 40 41 42 43 44 45 46 Period

(E_{FK}-E_b)/ΡE_b

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5

35 36 37 38 39 40 41 42 43 44 45 46 Period

ΔΘ_{(R-L)}, mRad

FD data quality 1992 pass 7

0.5 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5

35 36 37 38 39 40 41 42 43 44 45 46 Period

E_{FE}/E_b

FD data quality 1992 pass 7

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

35 36 37 38 39 40 41 42 43 44 45 46 Period

Clusters/TKMH

-0.14

-0.12

-0.1

-0.08

-0.06

-0.04

-0.02 0

35 36 37 38 39 40 41 42 43 44 45 46 Period δlog(Ncl)/δE