Invriant Mass GeV

100 150 200 250 300

Number Of Events

0 500 1000

1500

2000

2500

3000

hist2 Nent = 6494 Mean = 138.1 RMS = 34.75

Invariant Mass 97 Data & NC Monte Carlo Data Topology S1 hist2