Invriant Mass GeV

80 100 120 140 160 180 200 220 240

Number Of Events

0

200

400

600

800

1000

1200

hist2 Nent = 3536 Mean = 205.1 RMS = 13.72

INV MASS SQUARK 200GeV_{hist2}