K norm 352.35 K mean 423.69 K rms 5.16 p norm 3860.36 p mean 437.90 p rms 3.21 bkgrd 11.60

35ps TDC ticks

410 420 430 440 0

5000

10000

Time of Flight : run 70644 : +4 GeV

e norm 1909.84 e mean 416.08 e rms 3.37 norm π 9913.86 mean π 417.08 rms π 3.51 μπ

e p

K