Plane Number

5 10 15 20 25 30 35 40 45

Response (MEU / plane)

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3

Uncalibrated Calibrated

Even Entries 19 Mean -0.0005534 RMS 0.01255

Planes / 0.01

Fractional Residual

-0.1 -0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1 0 1 2 3 4 5 6 7 8 9 Odd Entries 19 Mean 0.002829 RMS 0.01821

Even Planes Odd Planes