HVnom Mean 7192.27 RMS 1916.84

dN / N / 500 ADC

Raw ADC

0 5000 10000 15000 20000 0

0.05

0.1

0.15

HVlow Mean 5323.74 RMS 1413.35

HVnom Mean 7193.96 RMS 1919.47

dN / N / 500 ADC

Gain-Drift Corrected ADC

0 5000 10000 15000 20000 0

0.05

0.1 HVlow Mean 7212.24 RMS 1914.23