0 10 20 30 40 0 50 100 150 -310

×_{Mean 15.0625}

RMS 5.3124 Mean 15.9362 RMS 5.1097 Mean 14.1529 RMS 5.5410

0.6 GeV/c

0 10 20 30 40 0

50

100 -310

×_{Mean 9.0926}

RMS 3.4028 Mean 9.5424 RMS 3.4036 Mean 8.9949 RMS 3.5968

0.6 GeV/c

0 20 40 0

50

100 -310

×_{Mean 22.3624}

RMS 7.8041 Mean 23.1204 RMS 6.7928 Mean 19.8655 RMS 7.7494

1.0 GeV/c

0 20 40 0 20 40 60 80 -310

×_{Mean 13.0331}

RMS 4.9354 Mean 13.4772 RMS 4.6028 Mean 12.3856 RMS 4.9838

1.0 GeV/c

0 20 40 60 80 0 20 40 60 80 -310

×_{Mean 39.4579}

RMS 11.1595 Mean 41.2813 RMS 10.1377 Mean 35.1247 RMS 10.9802

2.0 GeV/c

0 20 40 60 80 0 20 40 60 -310

×_{Mean 22.9678}

RMS 7.4766 Mean 23.8363 RMS 7.0722 Mean 21.5735 RMS 7.1789

2.0 GeV/c

0 50 100 0 20 40 60 -310

×_{Mean 57.5069}

RMS 14.3502 Mean 57.7156 RMS 12.1484 Mean 49.9595 RMS 12.7560

3.0 GeV/c

0 50 100 0

20

40 -310

×_{Mean 33.1201}

RMS 9.4501 Mean 33.2058 RMS 8.3755 Mean 30.2886 RMS 8.4743

3.0 GeV/c

# Strips # Strips (1.5 PE cut)