0 10 20 30 0 50 100 150 -310

×_{Mean 13.8797}

RMS 4.9772 Mean 14.4826 RMS 4.8173 Mean 13.2947 RMS 5.3727

0.6 GeV/c

0 10 20 30 0

50

100 -310

×_{Mean 8.6635}

RMS 3.2531 Mean 9.0306 RMS 3.2524 Mean 8.5437 RMS 3.4722

0.6 GeV/c

0 20 40 0

50

100 -310

×_{Mean 21.3142}

RMS 7.4014 Mean 21.7937 RMS 6.6550 Mean 19.1863 RMS 7.8642

1.0 GeV/c

0 20 40 0 20 40 60 80 -310

×_{Mean 12.8224}

RMS 4.7894 Mean 13.0071 RMS 4.5026 Mean 12.0906 RMS 5.0207

1.0 GeV/c

0 20 40 60 80 0 20 40 60 80 -310

×_{Mean 39.0626}

RMS 11.1756 Mean 40.2439 RMS 10.0330 Mean 34.1491 RMS 11.1033

2.0 GeV/c

0 20 40 60 80 0

20

40

60 -310

×_{Mean 23.1135}

RMS 7.5265 Mean 23.6047 RMS 7.0072 Mean 21.0957 RMS 7.3770

2.0 GeV/c

0 50 100 0 20 40 60 -310

×_{Mean 55.6429}

RMS 14.6415 Mean 56.7171 RMS 12.0786 Mean 49.4222 RMS 12.7028

3.0 GeV/c

0 50 100 0

20

40

-310

×_{Mean 32.4719}

RMS 9.7471 Mean 33.0046 RMS 8.3837 Mean 30.2161 RMS 8.5354

3.0 GeV/c

# Strips # Strips (1.5 PE cut)