0 5 10 15 0 200 400 600 -310

×_{Mean 6.0637}

RMS 2.0898 Mean 2.4524 RMS 1.4606 Mean 2.6815 RMS 1.3757

0.6 GeV/c

0 5 10 15 0 100 200 300 400 -310

×_{Mean 3.1197}

RMS 1.1007 Mean 1.4339 RMS 0.8948 Mean 1.4973 RMS 0.9356

0.6 GeV/c

0 10 20 0 100 200

300 -310

×_{Mean 11.5475}

RMS 3.8108 Mean 10.3325 RMS 2.9872 Mean 10.3672 RMS 3.5199

1.0 GeV/c

0 10 20 0

100

200

-310

×_{Mean 7.1389}

RMS 2.4312 Mean 6.6844 RMS 1.8627 Mean 6.7828 RMS 2.1501

1.0 GeV/c

0 20 40 60 0

50

100 -310

×_{Mean 27.8609}

RMS 9.1829 Mean 28.2898 RMS 8.1662 Mean 25.0512 RMS 9.7051

2.0 GeV/c

0 20 40 60 0 20 40 60 -310

×_{Mean 16.7730}

RMS 6.4771 Mean 16.7010 RMS 5.7604 Mean 15.5775 RMS 6.5227

2.0 GeV/c

0 20 40 60 80 0 20 40 60 80 -310

×_{Mean 43.1331}

RMS 12.3057 Mean 45.1319 RMS 10.7898 Mean 37.2304 RMS 11.8691

3.0 GeV/c

0 20 40 60 80 0

20

40

-310

×_{Mean 25.1507}

RMS 8.4262 Mean 26.1017 RMS 7.6261 Mean 22.5585 RMS 7.8349

3.0 GeV/c

# Strips # Strips (1.5 PE cut)