0 5 10 15 20 0.0

0.5

1.0_{Mean 2.5009}

RMS 0.8223 Mean 1.1803 RMS 0.5771 Mean 1.1080 RMS 0.4639

0.6 GeV/c

0 5 10 0.0

0.5

1.0 0.6 GeV/c

0 5 10 15 20 0.0 0.1 0.2 0.3 Mean 6.1593 RMS 1.8671 Mean 5.9611 RMS 1.5290 Mean 5.9036 RMS 1.7526

1.0 GeV/c

0 5 10

0.00

0.05

0.10

0.15

0.20

1.0 GeV/c

0 20 40

0.00

0.02

0.04

0.06

0.08

Mean 13.1598 RMS 5.8521 Mean 12.7753 RMS 5.0373 Mean 11.6625 RMS 5.4897

2.0 GeV/c

0 10 20 30

0.00

0.05

0.10

2.0 GeV/c

0 20 40

0.00

0.02

0.04

0.06

0.08^{Mean 16.7871}

RMS 7.0805 Mean 16.7054 RMS 6.4624 Mean 14.7910 RMS 6.0844

3.0 GeV/c

0 10 20 30

0.00

0.05

0.10

3.0 GeV/c

# Planes Hit Shower Profile