0 100 200 0

50

100 -310

×_{Mean 85.2297}

RMS 51.3630 Mean 90.2277 RMS 52.2770 Mean 84.7349 RMS 53.7272

0.6 GeV/c

0 20 40 60 80 0

50

100 -310

×_{Mean 27.2973}

RMS 16.7268 Mean 28.9931 RMS 17.0238 Mean 27.3542 RMS 17.6812

0.6 GeV/c

0 100 200 300 400 0 20 40 60 -310

×_{Mean 143.8658}

RMS 75.0043 Mean 148.6939 RMS 76.7999 Mean 137.4275 RMS 78.5701

1.0 GeV/c

0 50 100 0 20 40 60 80^{-3}10×_{Mean 46.0732}

RMS 24.3562 Mean 47.7627 RMS 25.0797 Mean 43.9578 RMS 25.2983

1.0 GeV/c

0 200 400 600 0 10 20 30 40 -310

×_{Mean 293.7848}

RMS 112.7178 Mean 303.1423 RMS 117.5162 Mean 284.7007 RMS 120.7510

2.0 GeV/c

0 50 100 150 200 0

20

40 -310

×_{Mean 95.1969}

RMS 36.8879 Mean 97.1821 RMS 38.2279 Mean 91.3055 RMS 39.2819

2.0 GeV/c

0 200 400 600 800 0 10 20 30 40^{-3}10×_{Mean 467.1832}

RMS 146.4485 Mean 466.5570 RMS 150.9326 Mean 438.6788 RMS 151.4804

3.0 GeV/c

0 100 200 300 0 10 20 30 40 -310

×_{Mean 145.3705}

RMS 46.0933 Mean 149.2404 RMS 48.8281 Mean 140.3280 RMS 49.0422

3.0 GeV/c

Calorimeter Signal (PEs) Calorimeter Signal (MIPs)