0 100 200 300 0

50

100 -310

×_{Mean 92.0809}

RMS 55.5064 Mean 93.5900 RMS 57.5192 Mean 86.3202 RMS 57.4186

0.6 GeV/c

0 20 40 60 80 100 0

50

100 -310

×_{Mean 29.3606}

RMS 17.9040 Mean 30.1668 RMS 18.7997 Mean 27.7553 RMS 18.6863

0.6 GeV/c

0 100 200 300 400 0 20 40 60 -310

×_{Mean 154.9563}

RMS 80.6479 Mean 151.3341 RMS 79.8224 Mean 138.6853 RMS 84.1835

1.0 GeV/c

0 50 100 0 20 40 60 80^{-3}10×_{Mean 49.2940}

RMS 25.8951 Mean 48.6013 RMS 25.9835 Mean 44.4757 RMS 27.3451

1.0 GeV/c

0 200 400 600 0 10 20 30 40 -310

×_{Mean 310.3784}

RMS 115.2903 Mean 309.5184 RMS 118.2947 Mean 286.8794 RMS 125.6171

2.0 GeV/c

0 50 100 150 200 0 10 20 30 40 -310

×_{Mean 100.5041}

RMS 37.8450 Mean 99.2122 RMS 38.3371 Mean 91.7437 RMS 40.5291

2.0 GeV/c

0 200 400 600 800 0 10 20 30 -310

×_{Mean 457.8990}

RMS 144.1782 Mean 473.1044 RMS 150.1346 Mean 439.0376 RMS 151.5363

3.0 GeV/c

0 100 200 300 0 10 20 30 40 -310

×_{Mean 150.0701}

RMS 47.6849 Mean 151.5537 RMS 48.5954 Mean 140.5052 RMS 49.0833

3.0 GeV/c

Calorimeter Signal (PEs) Calorimeter Signal (MIPs)