0 50 100 150 0.0

0.5

1.0 Mean 45.8989

RMS 22.4374 Mean 6.7272 RMS 5.9077 Mean 6.7345 RMS 6.1083

0.6 GeV/c

0 20 40 60 0.0

0.5

1.0 Mean 14.6749

RMS 7.0744 Mean 2.2238 RMS 1.8601 Mean 2.2304 RMS 1.9429

0.6 GeV/c

0 100 200 300 0 50 100 150 200 -310

×_{Mean 90.3976}

RMS 45.9729 Mean 80.3208 RMS 39.2381 Mean 78.8935 RMS 43.8733

1.0 GeV/c

0 50 100 0 50 100 150 200 -310

×_{Mean 28.0876}

RMS 14.2693 Mean 25.6827 RMS 12.6452 Mean 25.1803 RMS 14.0547

1.0 GeV/c

0 200 400 600 800 0 20

40

60 -310

×_{Mean 208.7087}

RMS 95.8894 Mean 212.2227 RMS 105.9042 Mean 205.6918 RMS 109.8331

2.0 GeV/c

0 100 200 0 20 40 60 -310

×_{Mean 67.3500}

RMS 31.2531 Mean 67.8751 RMS 34.1417 Mean 65.7672 RMS 35.3371

2.0 GeV/c

0 500 1000 0 10 20 30 40 -310

×_{Mean 336.1433}

RMS 128.9812 Mean 355.3089 RMS 142.0784 Mean 334.6137 RMS 148.8670

3.0 GeV/c

0 100 200 300 0 10 20 30 40 -310

×_{Mean 110.1916}

RMS 42.8687 Mean 113.6123 RMS 45.6647 Mean 106.7616 RMS 47.6510

3.0 GeV/c

Calorimeter Signal (PEs) Calorimeter Signal (MIPs)