Comparison of μ dE/dx vs plane for MC and data

Use same cuts to select stops in plane 53 and above in both MC and data MC: 2.05 GeV, momentum spread 1% Data: 2 GeV settings Use 3 GeV through-going muons to take out scintillator/connector variations

Comparison of dE/dx vs plane for MC and data

As before, but now MC:

2.05 GeV, momentum spread 5%