ROD & ROD99 Documents

Documents undergoing change:

ROD Essential Model (Text): ROD_essential.ps (Figures): ROD_essential_figs.ps Preliminary Interface Specifications:

ROD Input Data Format: abc_mcc.pdf ROD99 to/from Optocard: Link_interface.doc, Link interface.pdf ROD99 to/from Readout Buffers: readout.pdf ROD99 to/from TTC Distribution: ROD99tofromTTC.txt ROD99 to/from Readout Controller: (nothing yet) ROD VME Interface Requirements Document rod_vme.ps, rod_vme.txt ROD Slot Pinout RodPinout1.pdf

Draft documents ready for comment:

ROD99 Functional Requirements: ROD99reqmt.doc, ROD99reqmt.pdf

Final Versions of documents

Nothing_yet.txt

Related Sites

Steve Pier’s ROD Implementation Documents

Documents for reviewers

ROD99 Functional Requirements: ROD99reqmt.doc, ROD99reqmt.pdf ROD Essential Model (Text): ROD_essential.ps (Figures): ROD_essential_figs.ps Implementation specific links:

DSP approach DSP_link FPGA approach FPGA_link