Pixel&SCTOff-DetectorElectronics

12November98

L1pipeline+ derandomizer

RCC ROD +BOC

ROD +BOC

TIM

SCTorPixel Detector Module

standard TTClink

ROB

ROB

x16

x16sets/ROD

Clk L1A data [2x40(80) Mbpslinks] clk& ctl [40Mbpslinks]

SCT TTC

ondetector 4088SCTmodules 2586pixelmodules incavern 256SCT RODs ~16SCTcrates 81Pixel RODs ~6Pixelcrates formatteddata [1(2)x1Gbpsfiber] incountinghouse in cavern

ROB

ROB 256SCT ROBs 162pixel ROBs toLVL1 SCT DAQ LAN

SCT DAQ