Search | Site Map | Login | Register | Contact Us

Quick Search

About Agilent | Products & Services | Industries | International | Online Stores

Home > Products & Services > Semiconductor Products Home > Product Information and Literature

Product Information and Literature

Design Tools

Events

Guided Selection

Library

News Releases

Order Information

Partner Portal

Global Account Sites Product Index

Hot Links Product Center Application Notes Datasheets Samples FAQs Product Change Notifications

HFBR-2316T

155 MBd 1300 nm Fiber Optic Receiver with Dual-in-line Package Panel-Mountable ST & SC Connector

LIFE CYCLE STATUS AC - Active This product is Market released and in full production.

FEATURES

Low Cost Fiber Optic Link Signal Rates over 155 Megabaud 1300 nm Wavelength Link Distances over 5 km Dual-in-line Package Panel-Mountable ST* and SC Connector Receptacles Auto-Insertable and Wave-Solderable Specified with 62.5/125 um and 50/125 um Fiber Compatible with HFBR-0400 Series

Available Literature Datasheet HFBR-1312T/2316T - 1300 nm Fiber Optic Transmitter and Receiver

187 KB

pdf

Application Note AN 1123: Inexpensive 20 to 160 MBd Fiber-Optic Solutions for Industrial, Medical, Telecom, and Proprietary Data Communication Applications

164 KB

pdf

Application Note AN 1137: Generic Printed Circuit Layout Rules for Low-Cost Fiber Optic Components

36 KB pdf

Application Note AN 1121: Inexpensive dc to 32

96 KB pdf

Add to my links

Keep me updated

Help downloading files

MBd Fiber-Optic Solutions for Industrial, Medical, Telecom, and Proprietary Data Communication Applications Application Note AN 1122: Inexpensive 2 to 70 MBd Fiber-Optic Solutions for Industrial, Medical, Telecom, and Proprietary Data Communication Applications

63 KB pdf

Reliability Data 1300nm Fiber Optic Transmitter and Receiver

49 KB pdf

Regulatory Certificate Fiber Optic Components UL Regulatory Certificate

369.147 KB pdf Regulatory Certificate Fiber Optic Components UL Regulatory Certificate for Canada

338.343 KB pdf

Design Tools Layout Printed circuit artwork for circuits shown in Application Note 1122

53.558 KB Layout Printed circuit artwork for circuits shown in Application Note 1123

69 KB pdf

Layout Printed circuit artwork Trans1.exe for circuits 3 & 4 shown in AN 1121

100 KB pdf

Layout Printed circuit artwork Trans2.exe for circuits 3 & 5 shown in AN 1121

108 KB pdf

Layout Printed circuit artwork for circuits shown in Application Brief 78

84 KB pdf

Layout Printed circuit artwork for circuits shown in Application Note 1123 122 KB pdf

Related Products HFBR-0310 Evaluation Kit for Proprietary Point-to-Point and Distance Extension for Applications up to 155 MBd HFBR-1312T 155 MBd 1300 nm Fiber Optic Transmitter with Dual-in-line Package Panel-Mountable ST & SC Connector

© 2000 - 2003 Agilent Technologies Terms of Use Privacy Statement