T2UK-95-03Figure 1. Functional architecture of asecond level trigger system.Figure 2. Block diagram of a second leveltrigger system implementation.Figure 3. Test beam set-up, autumn 1994.

T2UK-95-03Figure 4. Example event recorded by thetest beam system.Figure 5. Logic Analyser trace for an SCI move.Figure 6. T2 buffer design.

T2UK-95-03Figure 7. Block diagram of the SCI Daughter Card.Figure 8. Using 3 Link Units to simulate acomplete mesh.Figure 9. Logic Analyser trace for a PCIDMA to Alpha memory.

T2UK-95-03Figure 10. Example result from modelling asecond level trigger system with an SCInetwork.Figure 11. Test beam set-up for 1995.