JTAG Programmer Guide

Appendix B

JTAG Parallel Cable Schematic

This appendix contains a schematic of the Parallel Download Cable. It is included in case you want to build your own download cables. schematic, Figure B-1, is our current version of the Parallel Download Cable. If you want to build a parallel cable, this is the recommended schematic.

You must use recommended lengths for parallel cables. Xilinx cables are typically six feet (about two meters) in length.

Parallel Download Cable