[Tools] [Modify][User] [Help]

FDR of the SCT/PIXEL TIM module

CERN 14-4-030 Philippe Farthouat

Reviewers:

Philippe Farthouat (CERN) Sophir Baron (CERN)

TIM Overview(10’) (UCL) Context within ROD crate Context with TTC

TIM Requirements(10’) John B. Lane (UCL)

TIM Interface to ROD crate components(10’) Matthew Warren (UCL)

TIM Interface to TTC (TTC signals/BCID)(15’) John B. Lane (UCL)

TIM Hardware(45’)

Hardware (inputs/outputs/clocks/busys)(15’) MP PCB layout(05’) MP Changes TIM-2 -> TIM-3A -> TIM-3B(10’) MW Firmware(15’) MW

TTCrm/TTCrq issue(15’) Martin Postranecky Hardware Jitter plots

Resonant triggers (15’)

Firmware Matthew Warren Adaptability (& Tony Weidberg on video/phone)

Performance testing(45’)

Latency(10’) JBL (10’) JBL (10’) MP

Some test results (15’) John HillCambridge

Schedule for production(05’) Jonathan M. Butterworth (UCL)

Costs (05’) Martin Postranecky

Discussion (50’) All

Bugs and reports) Powered by CDS Agenda for your own meetings/conferences, pleasecontact us