ADC 100 200 300 400 500 600 700 800 900 1000 0 20 40 60 80 100 120 140 160 180 200 220 cosm_2 Nent = 20197 Mean = 104.3 RMS = 71.76

histo

cosm_2

ADC 100 200 300 400 500 600 700 800 900 1000 0 20 40 60 80 100 120 140 160 180 200 cosm_3 Nent = 17839 Mean = 88.15 RMS = 56.4

histo

cosm_3

ADC 100 200 300 400 500 600 700 800 900 1000 0 20 40 60 80 100 120 140 160 180 200 220 cosm_4 Nent = 20346 Mean = 99.32 RMS = 67.95

histo

cosm_4

ADC 100 200 300 400 500 600 700 800 900 1000 0 20 40 60 80 100 120 140 160 180 200 220 240 cosm_5 Nent = 22967 Mean = 92 RMS = 59.97

histo

cosm_5

ADC 100 200 300 400 500 600 700 800 900 1000 0 20 40 60 80 100 120 140 160 180 200 220 cosm_6 Nent = 21836 Mean = 122.4 RMS = 85.14

histo

cosm_6

ADC 100 200 300 400 500 600 700 800 900 1000 0 20 40 60 80 100 120 140 160 180 200 220 cosm_7 Nent = 16818 Mean = 81.44 RMS = 47.36

histo

cosm_7

ADC 100 200 300 400 500 600 700 800 900 1000 0 20 40 60 80 100 120 140 160 180 200 220 cosm_8 Nent = 19490 Mean = 107.8 RMS = 73.48

histo

cosm_8

ADC 100 200 300 400 500 600 700 800 900 1000 0

50

100

150

200 250 cosm_9 Nent = 21859 Mean = 92.05 RMS = 63.4

histo

cosm_9

ADC 100 200 300 400 500 600 700 800 900 1000 0 20 40 60 80 100 120 140 160 180 200 220 cosm_10 Nent = 21560 Mean = 106.9 RMS = 70.44

histo

cosm_10

ADC 100 200 300 400 500 600 700 800 900 1000 0

50

100

150

200 250 cosm_11 Nent = 19695 Mean = 95.01 RMS = 63.33

histo

cosm_11

ADC 100 200 300 400 500 600 700 800 900 1000 0 20 40 60 80 100 120 140 160 180 200 220 cosm_12 Nent = 20225 Mean = 102.2 RMS = 68.94

histo

ADC 100 200 300 400 500 600 700 800 900 1000 0

50

100

150

200 250 cosm_13 Nent = 21796 Mean = 111.1 RMS = 78.28

histo

cosm_13

ADC 100 200 300 400 500 600 700 800 900 1000 0 20 40 60 80 100 120 140 160 180 200 220 240 cosm_14 Nent = 20104 Mean = 106.9 RMS = 73.56

histo

cosm_14

ADC 100 200 300 400 500 600 700 800 900 1000 0 20 40 60 80 100 120 140 160 180 200 220 cosm_15 Nent = 18473 Mean = 96.22 RMS = 64.3

histo

ADC 100 200 300 400 500 600 700 800 900 1000 0 20 40 60 80 100 120 140 160 180 200 cosm_16 Nent = 20064 Mean = 104.5 RMS = 68.57

histo

cosm_16

ADC 100 200 300 400 500 600 700 800 900 1000 0 20 40 60 80 100 120 140 160 180 cosm_17 Nent = 14222 Mean = 80.7 RMS = 50.01

histo