MeV 0.2 0.4 0.6 0.8 1 1.2 1.4 0 20 40 60 80 100 120 140 160 180 200 220 htemp Nent = 7407 Mean = 0.7943 RMS = 0.3278

Esc K40 from the floor (MC)

ADC 100 200 300 400 500 600 700 800 900 1000 0 5 10 15 20 25 30 35 40 adc Nent = 7407 Mean = 171.5 RMS = 113.4

adc